ALTER TABLE bus_device_history ADD COLUMN block1 int(255) DEFAULT NULL COMMENT '运行时电机压力值';
ALTER TABLE bus_device_history ADD COLUMN block2 int(255) DEFAULT NULL COMMENT '非运行时电机压力值';
ALTER TABLE bus_device_history ADD COLUMN block_status varchar(255) DEFAULT NULL COMMENT '堵塞状态';
ALTER TABLE bus_device_history ADD COLUMN evening_time1 int(255) DEFAULT NULL COMMENT '夜间减档开始时间';
ALTER TABLE bus_device_history ADD COLUMN evening_time2 int(255) DEFAULT NULL COMMENT '夜间减档结束时间';
ALTER TABLE bus_device_history ADD COLUMN night_ratio int(255) DEFAULT NULL COMMENT '夜间减档比例';
ALTER TABLE bus_device_history ADD COLUMN reset_params int(255) DEFAULT NULL COMMENT '是否重设参数';

ALTER TABLE bus_infusion_history ADD COLUMN block1 int(255) DEFAULT NULL COMMENT '运行时电机压力值';
ALTER TABLE bus_infusion_history ADD COLUMN block2 int(255) DEFAULT NULL COMMENT '非运行时电机压力值';
ALTER TABLE bus_infusion_history ADD COLUMN block_status varchar(255) DEFAULT NULL COMMENT '堵塞状态';
ALTER TABLE bus_infusion_history ADD COLUMN evening_time1 int(255) DEFAULT NULL COMMENT '夜间减档开始时间';
ALTER TABLE bus_infusion_history ADD COLUMN evening_time2 int(255) DEFAULT NULL COMMENT '夜间减档结束时间';
ALTER TABLE bus_infusion_history ADD COLUMN night_ratio int(255) DEFAULT NULL COMMENT '夜间减档比例';
ALTER TABLE bus_infusion_history ADD COLUMN reset_params int(255) DEFAULT NULL COMMENT '是否重设参数';

ALTER TABLE sys_user ADD COLUMN psw_need_reset tinyint(1) DEFAULT NULL COMMENT '是否需要修改密码';
