ALTER TABLE `forward`.`model` 
ADD COLUMN `define` VARCHAR(45) NULL COMMENT '数据定义. 当type为int或float时表示范围,如10~100,1.2~9.8; 当type为string表示长度;当type为enum表示枚举值,如0,1,2,3;type为array表示数组,格式:type,len,如:int,10' AFTER `remark`,
CHANGE COLUMN `type` `type` VARCHAR(20) NULL DEFAULT NULL COMMENT '数据类型, int,float,string,enum,array' ;
